pt-br	module.name
en-us	Users

pt-br	title
en-us	Users

pt-br	subtitle
en-us	Manage users of the current drive

pt-br	form.lotacao.unidade
en-us	Section

pt-br	form.lotacao.perfil
en-us	Profile

pt-br	form.user.username
en-us	User name

pt-br	form.user.name
en-us	Name

pt-br	form.user.lastname
en-us	Lastname

pt-br	form.user.email
en-us	E-mail

pt-br	form.user.active
en-us	Enabled

pt-br	form.user.password
en-us	Ticket

pt-br	form.user.password_confirm
en-us	Password confirmation

pt-br	error.password_confirm
en-us	Password and password confirmation do not match.

pt-br	section.general.title
en-us	General

pt-br	section.general.subtitle
en-us	Basic user information

pt-br	section.lotation.title
en-us	Loans

pt-br	section.lotation.subtitle
en-us	Capacity is used to define the user access profile in the units.

pt-br	label.unity
en-us	Section

pt-br	label.role
en-us	Profile

pt-br	button.add
en-us	Add

pt-br	button.save
en-us	Save

pt-br	button.back
en-us	Back

pt-br	button.close
en-us	Close

pt-br	button.change
en-us	Change

pt-br	button.new_user
en-us	new user

pt-br	button.change_password
en-us	Change password

pt-br	button.view_permissions
en-us	View Permissions

pt-br	button.remove
en-us	Remove

pt-br	label.lotation
en-us	Stocking

pt-br	label.name
en-us	Name

pt-br	label.description
en-us	Description

pt-br	label.permissions
en-us	Permission

pt-br	label.status
en-us	Status

pt-br	label.enabled
en-us	Enabled

pt-br	label.disabled
en-us	Disabled

pt-br	label.search
en-us	Search

pt-br	label.username
en-us	User name

pt-br	label.change_password
en-us	Change password

pt-br	label.add_sucess

pt-br	error.no_lotation

pt-br	error.add_lotation_permission_denied

pt-br	error.remove_lotation_permission_denied

pt-br	error.permission_denied
en-us	Permission denied

pt-br	error.more_than_one_lotation